/**
 * Dummy component test to ensure Cypress component testing doesn't fail
 * when no actual component tests exist.
 * 
 * This file can be removed once real component tests are added.
 */

describe('Dummy Component Test', () => {
  it('should pass', () => {
    // This is a placeholder test to prevent CI failures
    // when running component coverage tests
    expect(true).to.be.true;
  });
});